%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Gille_etal2010} Gille, S., Bourassa, M. A., \& Clayson, C. A. (2010). Improving Observations of High-Latitude Fluxes Between Atmosphere, Ocean, and Ice: Surface Fluxes: Challenges at High Latitudes; Boulder, Colorado, 17-19 March 2010. \textit{Eos Trans. AGU}, \textit{91}(35), 307.

\end{thebibliography}

\end{document}

