0

5

10

15

EIMR (mm/day) mod-eimr cmap-eimr mod-kellj ncep-kellj

Jan Feb Mar Apr May Jun Jul Aug Sep Oct Nov Dec 0

50

100

150

200

KELLJ (m 2s-2)