Depth (m)

HYCOM KPP

0 1 2 3 4 5 6 7 8 9 10 11 12

0 20 40 60 80 100 120 140 160

MICOM

0 1 2 3 4 5 6 7 8 9 10 11 12

0 20 40 60 80 100 120 140 160

Month

HYCOM KT1

0 1 2 3 4 5 6 7 8 9 10 11 12

0 20 40 60 80 100 120 140 160

5 10 15 20 25 30

Month

HYCOM KT2

0 1 2 3 4 5 6 7 8 9 10 11 12

0 20 40 60 80 100 120 140 160

Sargasso Sea Temperature (C)