Depth (m)

HYCOM KPP

-80 -60 -40 -20

0

100

200

300

400

500

MICOM

-80 -60 -40 -20

0

100

200

300

400

500

Longitude

HYCOM KT1

-80 -60 -40 -20

0

100

200

300

400

500

0 5 10 15 20 25 30

Longitude

HYCOM KT2

-80 -60 -40 -20

0

100

200

300

400

500

Temperature (C), 27N, Winter