08/07/03 11/15/03 02/23/04 06/02/04 09/10/04 22 24 26 28 30 32 34 36 38 40 42

Layer 1-26 Mean: 31.42 Min: 22.73 Max: 36.93 Std: 2.38 Corr: 0.60

From 10-Jun-2003 to 24-Nov-2004

Transport (SV)

Cable Data HYCOM (9.1)

HYCOM ATLd0.08-9.1-nowcast: Florida Strait at 26.95N