1024 1025 1026 1027 1028

1000

800

600

400

200

0

Density (kg/m^3)

Depth (m)

Density Profile

-2 0 2 4 6 x 10^{-3}

1000

800

600

400

200

0

Amplitude

First Three Baroclinic Modes