11 47 84 117 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

0.4

0.45

0.5 Amplitude for T/P CPCA MODE #1 46.95% of Variance

T/P cycles

Amplitude (m)

1993 1994 1995