Addendum to WOCEMET 97-22Charles Darwin Multimet AWS Data Quality Control ReportShawn R. SmithSurface Meteorological Data Assembly CenterCenter for Ocean-Atmospheric Prediction StudiesThe Florida State University9 December 1998

This addendum outlines changes made to the R/V Charles Darwinmeteorological data described in WOCEMET 97-22. The changes include correctionof the shortwave radiation data and modification of the cruise identification codes(ctc, EXPOCODE, and facility). The corrected data files (*v112.nc or *v112.asc) havebeen posted to our ftp site and web pages.

Radiation Correction:Initial evaluation by WOCEMET’s Data Quality Evaluator (DQE) revealed thatthe shortwave radiation (RAD2) had magnitudes that were only 50% of theirexpected value. When WOCEMET 97-22 was published, the DQE was unaware ofany cause for these low radiation values and flagged all the shortwave radiation dataas suspect. In early December we were notified by Dr. P. K. Taylor of theSouthampton Oceanography Center that a different sensor amplifier was used onthe Multimet system during these 1991 cruises. As a result the reported shortwaveradiation data were exactly 50% too small. This error was easily corrected bymultiplying all reported shortwave radiation data by 2.0 and changing all thecautionary flags (K) to flags indicating that the value passed evaluation (Z) . Arealistic range test was applied to the corrected RAD2 data to ensure that the newvalues fall between 0 and 1400 Wm-2. If this test failed, a bounds (B) flag was applied.

Cruise Identification:In early December we also received information that the cruise identified asthe AR_12_/03 line in WOCEMET 97-22 was not an official WOCE cruise. The datawere collected for calibration/validation of ERS-1. Therefore, this cruise has been re-labeled with the new cruise track code (ctc) "ERS-1 c/v". Other changes were made tothe global file attributes facility and EXPOCODE to clearly identify this ERS-1 cruise.The ERS-1 cal/val cruise data are of very high quality so they remain on-line for ourdata users; however, we plan to move or link this cruise to a new archive of "otherhigh-resolution, quality-controlled meteorology data".The cruise labeled in WOCEMET 97-22 as AR_07E/03 actually covered boththe AR07E and AR12 WOCE lines (based upon WHPO records). For simplicity onour part, the ctc will remain AR_07E/03 within the data files for this cruise, and thedata will be cross-referenced with the AR_12_/03 line in our archive.NOTE: WHEN READING ORIGINAL REPORT 97-22 ALL REFERENCES TOAR_12_/03 REFER TO THE ERS-1 c/v CRUISE.NOTE: If you have downloaded either of these Charles Darwin cruises priorto 15 December 1998 please return to our ftp or web sites and download the *v112files. Please direct any questions concerning these updates towocemet@coaps.fsu.edu.