Kaiyo Bridge Data Quality Control ReportCruises: PR_01S/04PR_23_/05Daniel M. Gilmore and Shawn SmithWorld Ocean Circulation Experiment(WOCE)Surface Meteorological Data Assembly CenterCenter for Ocean Atmospheric Prediction StudiesThe Florida State UniversityJanuary 10, 1997Report WOCEMET 97-1Version 1.0

Introduction:The data referenced in this report were collected from the Kaiyo(call sign: JRPG;data source: WHPO/M. Aoyama) standard bridge observations for 2 differentWOCE cruises. The data were received by the Data Assembly Center(DAC) inelectronic format and converted to a standard FSU format. They were thenpreprocessed using an automated data checking program. Next a visual checkwas completed by a Data Quality Evaluator who reviewed, modified and addedappropriate quality control (QC) flags to the data. Details of the WOCE QC canbe found in Smith et al. (1996). The data quality control report summarizes theflags for the Kaiyo Bridge Log data, including those added by both thepreprocessor and the analyst.Statistical Information:The data set from the Kaiyo was expected to include observations taken every 3hours from 2 cruises. The start and end dates, the number of records and valuesand the number and percentage of flags added is given in table 1.Table 1: List of Dates and Number of Records for Each CruiseCruise:

Dates

Number ofRecords

Numberof Values

Numberof Flags

PercentageFlagged

PR_01S/04

02/07/94 - 03/04/94

1921344

0.00PR_23_/0501/14/95 - 01/24/957777000.002

Time (TIME), latitude (LAT), longitude (LON), earth relative wind direction(DIR), earth relative wind speed (SPD), atmospheric pressure (P), atmospherictemperature (T), sea temperature (TS), dew-point temperature (TD), and wet-bulb temperature (TW) were quality controlled. A total of 2114 values werechecked, with no flags added. Summary:These data are in excellent condition. No flags were added by either theprescreener or the analyst. Final Comment:These data are in outstanding condition, and the analyst foresees no problemusing them.References:Smith, S.R., C. Harvey, and D.M. Legler, 1996: Handbook of Quality ControlProcedures and Methods for Surface Meteorology Data. WOCE ReportNo. 141/96, Report WOCEMET 96-1, Center for Ocean AtmosphericPrediction Studies, Florida State University, Tallahassee, FL 32310. 3